---
title: "MCP servers"
description: ""
---

OpenCode can connect to [Model Context Protocol](https://modelcontextprotocol.io/) servers and make their tools, prompts, and instructions available to agents. MCP tools consume model context, so enable only the servers you need.

## Configure servers

Define each server by a unique name under `mcp.servers` in your [OpenCode configuration](/config). V2 does not place server names directly under `mcp`.

```jsonc title="opencode.jsonc"
{
  "$schema": "https://opencode.ai/config.json",
  "mcp": {
    "servers": {
      "my-server": {
        "type": "local",
        "command": ["npx", "-y", "example-mcp-server"]
      }
    }
  }
}
```

Servers connect automatically unless `disabled` is `true`. There is no V2 `enabled` field.

```jsonc
{
  "mcp": {
    "servers": {
      "my-server": {
        "type": "local",
        "command": ["npx", "-y", "example-mcp-server"],
        "disabled": true
      }
    }
  }
}
```

As with other configuration, a server in a higher-precedence project config replaces a server with the same name from a lower-precedence config. Use different names when you need separate connections or accounts.

## Local servers

A local server is a command that OpenCode starts using the MCP stdio transport.

```jsonc title="opencode.jsonc"
{
  "$schema": "https://opencode.ai/config.json",
  "mcp": {
    "servers": {
      "everything": {
        "type": "local",
        "command": [
          "npx",
          "-y",
          "@modelcontextprotocol/server-everything"
        ],
        "cwd": ".",
        "environment": {
          "LOG_LEVEL": "info",
          "MCP_API_KEY": "{env:MCP_API_KEY}"
        }
      }
    }
  }
}
```

| Field | Required | Description |
| --- | --- | --- |
| `type` | Yes | Must be `"local"`. |
| `command` | Yes | Executable followed by its arguments. |
| `cwd` | No | Process working directory. Relative paths resolve from the workspace directory; the workspace is the default. |
| `environment` | No | String environment variables added to the inherited OpenCode process environment. |
| `disabled` | No | Set to `true` to prevent the server from connecting. Defaults to `false`. |
| `codemode` | No | Set to `false` to expose the server's tools directly to the model instead of through Code Mode. Defaults to `true`. |
| `timeout` | No | Per-server timeout overrides. |

Use `{env:NAME}` to substitute an environment variable while loading config. Shell expressions such as `$NAME` are not expanded in JSON strings.

## Remote servers

A remote server uses the MCP Streamable HTTP transport. Its `url` must be a valid absolute URL.

```jsonc title="opencode.jsonc"
{
  "$schema": "https://opencode.ai/config.json",
  "mcp": {
    "servers": {
      "context7": {
        "type": "remote",
        "url": "https://mcp.context7.com/mcp",
        "oauth": false,
        "headers": {
          "CONTEXT7_API_KEY": "{env:CONTEXT7_API_KEY}"
        }
      }
    }
  }
}
```

| Field | Required | Description |
| --- | --- | --- |
| `type` | Yes | Must be `"remote"`. |
| `url` | Yes | Streamable HTTP endpoint. |
| `headers` | No | String HTTP headers sent to the MCP endpoint. |
| `oauth` | No | OAuth client settings, or `false` to disable OAuth support. |
| `disabled` | No | Set to `true` to prevent the server from connecting. Defaults to `false`. |
| `codemode` | No | Set to `false` to expose the server's tools directly to the model instead of through Code Mode. Defaults to `true`. |
| `timeout` | No | Per-server timeout overrides. |

Use `oauth: false` for a server that exclusively uses an API key or another header-based credential.

## OAuth

OAuth support is enabled for remote servers unless `oauth` is `false`. OpenCode discovers the authorization server, uses PKCE, refreshes tokens, and attempts dynamic client registration when the server supports it. OAuth credentials are stored outside project configuration.

For a server that supports dynamic client registration, only the remote server is required:

```jsonc title="opencode.jsonc"
{
  "$schema": "https://opencode.ai/config.json",
  "mcp": {
    "servers": {
      "sentry": {
        "type": "remote",
        "url": "https://mcp.sentry.dev/mcp"
      }
    }
  }
}
```

When the server reports that it needs authentication, run `/connect` in the TUI:

```text
/connect
```

Select the MCP server under **Services**, then complete the browser authorization flow.

You can also authenticate from the command line:

```bash
opencode2 mcp auth sentry
```

The CLI command prints the authorization URL and waits for the redirect to OpenCode's loopback callback server.

If the provider issued client credentials, configure them using V2's snake_case field names:

```jsonc title="opencode.jsonc"
{
  "$schema": "https://opencode.ai/config.json",
  "mcp": {
    "servers": {
      "company-tools": {
        "type": "remote",
        "url": "https://mcp.example.com/mcp",
        "oauth": {
          "client_id": "{env:MCP_CLIENT_ID}",
          "client_secret": "{env:MCP_CLIENT_SECRET}",
          "scope": "tools:read tools:execute",
          "callback_port": 19876,
          "redirect_uri": "http://127.0.0.1:19876/callback"
        }
      }
    }
  }
}
```

| OAuth field | Description |
| --- | --- |
| `client_id` | Pre-registered OAuth client ID. If omitted, OpenCode attempts dynamic client registration. |
| `client_secret` | Client secret for a pre-registered client. |
| `scope` | Space-delimited scopes to request. |
| `callback_port` | Local callback port, from `1` through `65535`. An available ephemeral port is used by default. |
| `redirect_uri` | Pre-registered loopback redirect URI. Its path and port must reach the local callback listener. |

Remove stored credentials with:

```bash
opencode2 mcp logout sentry
```

## Timeouts

Timeouts are positive integer milliseconds. Configure defaults under `mcp.timeout`; a server's `timeout` fields override matching defaults.

```jsonc title="opencode.jsonc"
{
  "$schema": "https://opencode.ai/config.json",
  "mcp": {
    "timeout": {
      "startup": 45000,
      "catalog": 30000,
      "execution": 600000
    },
    "servers": {
      "slow-tools": {
        "type": "remote",
        "url": "https://mcp.example.com/mcp",
        "timeout": {
          "catalog": 60000
        }
      }
    }
  }
}
```

| Timeout | Default | Applies to |
| --- | --- | --- |
| `startup` | 30 seconds | Establishing the transport and initializing the server. |
| `catalog` | 30 seconds | Listing tools, prompts, resources, and resource templates. |
| `execution` | 12 hours | Calling tools, getting prompts, and reading resources. |

## Names and permissions

OpenCode combines the server name and MCP tool name as `<server>_<tool>`. Characters other than letters, numbers, `_`, and `-` are replaced with `_`; for example, server `context 7` and tool `resolve.library/id` become `context_7_resolve_library_id`. MCP prompts appear as slash commands named `<server>:<prompt>` using the same normalization.

Choose short server names that remain unique after normalization. Under the default Code Mode, MCP tools are grouped by the normalized server name.

Set `codemode` to `false` on a server when its tools should remain on the provider's native tool list:

```jsonc
{
  "mcp": {
    "servers": {
      "context7": {
        "type": "remote",
        "url": "https://mcp.context7.com/mcp",
        "codemode": false
      }
    }
  }
}
```

Use permission actions to hide or deny a server's tools without stopping its connection:

```jsonc
{
  "permissions": [
    {
      "action": "context7_*",
      "resource": "*",
      "effect": "deny"
    }
  ]
}
```

## CLI commands

V2 provides these MCP management commands:

```bash
# Add a local server to the project config
opencode2 mcp add everything --env LOG_LEVEL=info -- npx -y @modelcontextprotocol/server-everything

# Add a remote server to the project config
opencode2 mcp add context7 --url https://mcp.context7.com/mcp --header 'CONTEXT7_API_KEY={env:CONTEXT7_API_KEY}'

# Add to the global config instead
opencode2 mcp add context7 --global --url https://mcp.context7.com/mcp

# List configured servers and connection status
opencode2 mcp list

# Authenticate or remove OAuth credentials
opencode2 mcp auth context7
opencode2 mcp logout context7
```

`mcp add` accepts either `--url` for a remote server or a command after `--` for a local server, not both. Use `--header NAME=VALUE` only with remote servers and `--env NAME=VALUE` only with local servers. Edit the config directly for OAuth, timeout, working-directory, or enablement settings.
