---
title: Notifications
sidebarTitle: Notifications
description: Handle server-sent notifications for list changes and other events.
icon: envelope
---

import { VersionBadge } from "/snippets/version-badge.mdx";

<VersionBadge version="2.9.1" />

Use this when you need to react to server-side changes like tool list updates or resource modifications.

MCP servers can send notifications to inform clients about state changes. The message handler provides a unified way to process these notifications.

## Handling Notifications

The simplest approach is a function that receives all messages and filters for the notifications you care about:

```python
from fastmcp import Client

async def message_handler(message):
    """Handle MCP notifications from the server."""
    if hasattr(message, 'method'):
        method = message.method

        if method == "notifications/tools/list_changed":
            print("Tools have changed - refresh tool cache")
        elif method == "notifications/resources/list_changed":
            print("Resources have changed")
        elif method == "notifications/prompts/list_changed":
            print("Prompts have changed")
        elif method == "notifications/resources/updated":
            print("A resource was updated")

client = Client(
    "my_mcp_server.py",
    message_handler=message_handler,
)
```

## MessageHandler Class

For fine-grained targeting, subclass `MessageHandler` to use specific hooks:

```python
from fastmcp import Client
from fastmcp.client.messages import MessageHandler
import mcp.types

class MyMessageHandler(MessageHandler):
    async def on_tool_list_changed(
        self, notification: mcp.types.ToolListChangedNotification
    ) -> None:
        """Handle tool list changes."""
        print("Tool list changed - refreshing available tools")

    async def on_resource_list_changed(
        self, notification: mcp.types.ResourceListChangedNotification
    ) -> None:
        """Handle resource list changes."""
        print("Resource list changed")

    async def on_prompt_list_changed(
        self, notification: mcp.types.PromptListChangedNotification
    ) -> None:
        """Handle prompt list changes."""
        print("Prompt list changed")

client = Client(
    "my_mcp_server.py",
    message_handler=MyMessageHandler(),
)
```

### Handler Template

```python
from fastmcp.client.messages import MessageHandler
import mcp.types

class MyMessageHandler(MessageHandler):
    async def on_message(self, message) -> None:
        """Called for ALL messages (requests and notifications)."""
        pass

    async def on_notification(
        self, notification: mcp.types.ServerNotification
    ) -> None:
        """Called for notifications (fire-and-forget)."""
        pass

    async def on_tool_list_changed(
        self, notification: mcp.types.ToolListChangedNotification
    ) -> None:
        """Called when the server's tool list changes."""
        pass

    async def on_resource_list_changed(
        self, notification: mcp.types.ResourceListChangedNotification
    ) -> None:
        """Called when the server's resource list changes."""
        pass

    async def on_prompt_list_changed(
        self, notification: mcp.types.PromptListChangedNotification
    ) -> None:
        """Called when the server's prompt list changes."""
        pass

    async def on_progress(
        self, notification: mcp.types.ProgressNotification
    ) -> None:
        """Called for progress updates during long-running operations."""
        pass

    async def on_resource_updated(
        self, notification: mcp.types.ResourceUpdatedNotification
    ) -> None:
        """Called when a specific resource changes."""
        pass

    async def on_cancelled(
        self, notification: mcp.types.CancelledNotification
    ) -> None:
        """Called when a request is cancelled."""
        pass

    async def on_logging_message(
        self, notification: mcp.types.LoggingMessageNotification
    ) -> None:
        """Called for log messages from the server."""
        pass
```

## List Change Notifications

A practical example of maintaining a tool cache that refreshes when tools change:

```python
from fastmcp import Client
from fastmcp.client.messages import MessageHandler
import mcp.types

class ToolCacheHandler(MessageHandler):
    def __init__(self):
        self.cached_tools = []

    async def on_tool_list_changed(
        self, notification: mcp.types.ToolListChangedNotification
    ) -> None:
        """Clear tool cache when tools change."""
        print("Tools changed - clearing cache")
        self.cached_tools = []  # Force refresh on next access

client = Client("server.py", message_handler=ToolCacheHandler())
```

## Server Requests

While the message handler receives server-initiated requests, you should use dedicated callback parameters for most interactive scenarios:

- **Sampling requests**: Use [`sampling_handler`](/clients/sampling)
- **Elicitation requests**: Use [`elicitation_handler`](/clients/elicitation)
- **Progress updates**: Use [`progress_handler`](/clients/progress)
- **Log messages**: Use [`log_handler`](/clients/logging)

The message handler is primarily for monitoring and handling notifications rather than responding to requests.
