---
title: oidc_proxy
sidebarTitle: oidc_proxy
---

# `fastmcp.server.auth.oidc_proxy`


OIDC Proxy Provider for FastMCP.

This provider acts as a transparent proxy to an upstream OIDC compliant Authorization
Server. It leverages the OAuthProxy class to handle Dynamic Client Registration and
forwarding of all OAuth flows.

This implementation is based on:
    OpenID Connect Discovery 1.0 - https://openid.net/specs/openid-connect-discovery-1_0.html
    OAuth 2.0 Authorization Server Metadata - https://datatracker.ietf.org/doc/html/rfc8414


## Classes

### `OIDCConfiguration` <sup><a href="https://github.com/PrefectHQ/fastmcp/blob/main/src/fastmcp/server/auth/oidc_proxy.py#L28" target="_blank"><Icon icon="github" style="width: 14px; height: 14px;" /></a></sup>


OIDC Configuration.


**Methods:**

#### `get_oidc_configuration` <sup><a href="https://github.com/PrefectHQ/fastmcp/blob/main/src/fastmcp/server/auth/oidc_proxy.py#L143" target="_blank"><Icon icon="github" style="width: 14px; height: 14px;" /></a></sup>

```python
get_oidc_configuration(cls, config_url: AnyHttpUrl) -> Self
```

Get the OIDC configuration for the specified config URL.

**Args:**
- `config_url`: The OIDC config URL
- `strict`: The strict flag for the configuration
- `timeout_seconds`: HTTP request timeout in seconds


### `OIDCProxy` <sup><a href="https://github.com/PrefectHQ/fastmcp/blob/main/src/fastmcp/server/auth/oidc_proxy.py#L173" target="_blank"><Icon icon="github" style="width: 14px; height: 14px;" /></a></sup>


OAuth provider that wraps OAuthProxy to provide configuration via an OIDC configuration URL.

This provider makes it easier to add OAuth protection for any upstream provider
that is OIDC compliant.


**Methods:**

#### `get_oidc_configuration` <sup><a href="https://github.com/PrefectHQ/fastmcp/blob/main/src/fastmcp/server/auth/oidc_proxy.py#L432" target="_blank"><Icon icon="github" style="width: 14px; height: 14px;" /></a></sup>

```python
get_oidc_configuration(self, config_url: AnyHttpUrl, strict: bool | None, timeout_seconds: int | None) -> OIDCConfiguration
```

Gets the OIDC configuration for the specified configuration URL.

**Args:**
- `config_url`: The OIDC configuration URL
- `strict`: The strict flag for the configuration
- `timeout_seconds`: HTTP request timeout in seconds


#### `get_token_verifier` <sup><a href="https://github.com/PrefectHQ/fastmcp/blob/main/src/fastmcp/server/auth/oidc_proxy.py#L449" target="_blank"><Icon icon="github" style="width: 14px; height: 14px;" /></a></sup>

```python
get_token_verifier(self) -> TokenVerifier
```

Creates the token verifier for the specified OIDC configuration and arguments.

**Args:**
- `algorithm`: Optional token verifier algorithm
- `audience`: Optional token verifier audience
- `required_scopes`: Optional token verifier required_scopes
- `timeout_seconds`: HTTP request timeout in seconds

